Summary Page Created:Fri April 7, 2006 07:09 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600392

Instrument: ACIS Obs ID: 6170 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf06170N002 full img2.fits acisf06170N002 cntr img2.fits

Summary Page Created:Fri April 7, 2006 07:09 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600392

Instrument: ACIS Obs ID: 6170 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T09:42:47 Date and time of file creation DATE-OBS 2004-12-22T01:17:57 Observation start date DATE-END 2004-12-22T15:13:29 Observation end date RA PNT 210.95723535279 Pointing RA DEC PNT 54.363620523092 Pointing Dec ROLL PNT 53.702428111998 Pointing Roll RA TARG 210.950833 Observer’s specified target RA DEC TARG 54.361389 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T11:07:28 Date and time of file creation DATE-OBS 2004-12-22T01:17:57 Observation start date DATE-END 2004-12-22T15:13:29 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 6170 Observation id SEQ NUM 600392 Sequence number RA NOM 210.95723535279 Nominal RA DEC NOM 54.363620523092 Nominal Dec ROLL NOM 53.702428111998 Nominal Roll

Summary Page Created:Fri April 7, 2006 07:09 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600392

Instrument: ACIS Obs ID: 6170 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 211.059194 54.434607 1902.083374 49.848446 38.157326 210.809600 54.301641 873.342529 36.084389 24.202780 210.850821 54.330211 460.857147 24.966080 18.459332 211.351081 54.572668 1427.551514 82.276474 17.350664 211.183793 54.643892 1300.242554 79.319565 16.392458 210.974374 54.365917 235.714279 18.153345 12.984620 210.839826 54.329498 283.285706 22.625568 12.520601 211.166302 54.633404 901.040161 79.060417 11.396856 211.324064 54.549556 917.583313 82.086281 11.178279 210.900106 54.323549 162.352280 15.149723 10.716517