Summary Page Created:Tue June 6, 2006 15:50 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700881

Instrument: ACIS Obs ID: 4798 Source: F1610-3900 PI: Dr. JOHN SALZER Title: Anchoring the AGN X-ray Luminosity Function

acisf04798N002 full img2.fits acisf04798N002 cntr img2.fits

Summary Page Created:Tue June 6, 2006 15:50 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700881

Instrument: ACIS Obs ID: 4798 Source: F1610-3900 PI: Dr. JOHN SALZER Title: Anchoring the AGN X-ray Luminosity Function

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T19:15:39 Date and time of file creation DATE-OBS 2004-01-14T20:36:40 Observation start date DATE-END 2004-01-14T22:07:40 Observation end date RA PNT 243.07794564516 Pointing RA DEC PNT 29.579657901782 Pointing Dec ROLL PNT 51.443108313756 Pointing Roll RA TARG 243.069583 Observer’s specified target RA DEC TARG 29.573111 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T19:49:36 Date and time of file creation DATE-OBS 2004-01-14T20:36:40 Observation start date DATE-END 2004-01-14T22:07:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT F1610-3900 Source name TITLE Anchoring the AGN X-ray Luminosity Function

Proposal title

OBSERVER Dr. JOHN SALZER Principal investigator OBS ID 4798 Observation id SEQ NUM 700881 Sequence number RA NOM 243.07794564516 Nominal RA DEC NOM 29.579657901782 Nominal Dec ROLL NOM 51.443108313756 Nominal Roll

Summary Page Created:Tue June 6, 2006 15:50 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700881

Instrument: ACIS Obs ID: 4798 Source: F1610-3900 PI: Dr. JOHN SALZER Title: Anchoring the AGN X-ray Luminosity Function

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 242.983326 29.580726 51.875000 9.002207 5.762476 243.069575 29.573104 22.000000 6.248635 3.520769