Summary Page Created:Tue May 23, 2006 17:34 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700911

Instrument: ACIS Obs ID: 4829 Source: LBQS 0010-0012 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

acisf04829N002 full img2.fits acisf04829N002 cntr img2.fits

Summary Page Created:Tue May 23, 2006 17:34 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700911

Instrument: ACIS Obs ID: 4829 Source: LBQS 0010-0012 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-23T21:03:32 Date and time of file creation DATE-OBS 2004-06-27T22:15:12 Observation start date DATE-END 2004-06-28T00:35:26 Observation end date RA PNT 3.2731323211276 Pointing RA DEC PNT 0.084892326894758 Pointing Dec ROLL PNT 113.46699716461 Pointing Roll RA TARG 3.275417 Observer’s specified target RA DEC TARG 0.075472 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 154.09092712 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-23T21:33:07 Date and time of file creation DATE-OBS 2004-06-27T22:15:12 Observation start date DATE-END 2004-06-28T00:35:26 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 0010-0012 Source name TITLE Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line Quasars

Proposal title

OBSERVER Dr. Sarah Gallagher Principal investigator OBS ID 4829 Observation id SEQ NUM 700911 Sequence number RA NOM 3.2731323211276 Nominal RA DEC NOM 0.084892326894758 Nominal Dec ROLL NOM 113.46699716461 Nominal Roll

Summary Page Created:Tue May 23, 2006 17:34 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700911

Instrument: ACIS Obs ID: 4829 Source: LBQS 0010-0012 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 3.207631 0.386252 225.541534 31.675394 7.120401 3.097029 0.340383 159.897003 28.294863 5.651097 3.159070 0.367333 155.244644 29.624615 5.240394 3.308581 0.053658 43.857143 9.031466 4.856039 3.176973 0.373443 144.237503 31.793705 4.536669 3.321981 -0.109756 51.913391 12.165507 4.267261 3.227668 0.350508 95.625000 22.952801 4.166158 3.169125 0.371999 136.269104 32.740879 4.162047 3.104907 0.325125 128.403564 31.723175 4.047626 3.116360 0.346792 131.657806 32.952709 3.995356