Summary Page Created:Wed April 26, 2006 10:22 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700912

Instrument: ACIS Obs ID: 4830 Source: LBQS 0051-0019 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

acisf04830N002 full img2.fits acisf04830N002 cntr img2.fits

Summary Page Created:Wed April 26, 2006 10:22 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700912

Instrument: ACIS Obs ID: 4830 Source: LBQS 0051-0019 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-26T14:00:06 Date and time of file creation DATE-OBS 2004-08-05T15:14:53 Observation start date DATE-END 2004-08-05T17:35:47 Observation end date RA PNT 13.477901109041 Pointing RA DEC PNT -0.043202764446895 Pointing Dec ROLL PNT 109.76217539757 Pointing Roll RA TARG 13.479583 Observer’s specified target RA DEC TARG -0.052639 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-26T14:21:11 Date and time of file creation DATE-OBS 2004-08-05T15:14:53 Observation start date DATE-END 2004-08-05T17:35:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 0051-0019 Source name TITLE Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line Quasars

Proposal title

OBSERVER Dr. Sarah Gallagher Principal investigator OBS ID 4830 Observation id SEQ NUM 700912 Sequence number RA NOM 13.477901109041 Nominal RA DEC NOM -0.043202764446895 Nominal Dec ROLL NOM 109.76217539757 Nominal Roll

Summary Page Created:Wed April 26, 2006 10:22 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700912

Instrument: ACIS Obs ID: 4830 Source: LBQS 0051-0019 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 13.431692 0.263612 264.973419 30.134905 8.792907 13.425861 -0.075981 78.556816 10.835165 7.250173 13.435510 0.042960 70.875000 10.837148 6.540005 13.440376 0.244970 176.133926 29.856279 5.899393 13.672789 0.019462 87.328575 14.805485 5.898393 13.321388 0.224589 139.298996 29.311554 4.752358 13.393320 0.250552 149.561462 31.867756 4.693191 13.554916 -0.194232 56.193104 12.003309 4.681468 13.650166 -0.034059 45.110344 10.200250 4.422475 13.444049 0.235534 126.916664 28.736452 4.416574