Summary Page Created:Mon April 24, 2006 19:24 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700913

Instrument: ACIS Obs ID: 4831 Source: LBQS 0054+0200 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

acisf04831N002 full img2.fits acisf04831N002 cntr img2.fits

Summary Page Created:Mon April 24, 2006 19:24 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700913

Instrument: ACIS Obs ID: 4831 Source: LBQS 0054+0200 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-24T23:01:29 Date and time of file creation DATE-OBS 2004-08-17T02:45:14 Observation start date DATE-END 2004-08-17T04:54:02 Observation end date RA PNT 14.184174799265 Pointing RA DEC PNT 2.2845368769925 Pointing Dec ROLL PNT 109.86989964457 Pointing Roll RA TARG 14.185833 Observer’s specified target RA DEC TARG 2.275028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 154.57475281 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-24T23:23:00 Date and time of file creation DATE-OBS 2004-08-17T02:45:14 Observation start date DATE-END 2004-08-17T04:54:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 0054+0200 Source name TITLE Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line Quasars

Proposal title

OBSERVER Dr. Sarah Gallagher Principal investigator OBS ID 4831 Observation id SEQ NUM 700913 Sequence number RA NOM 14.184174799265 Nominal RA DEC NOM 2.2845368769925 Nominal Dec ROLL NOM 109.86989964457 Nominal Roll

Summary Page Created:Mon April 24, 2006 19:24 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700913

Instrument: ACIS Obs ID: 4831 Source: LBQS 0054+0200 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 14.027246 2.552174 194.903656 29.460157 6.615839 14.137256 2.591326 165.647842 26.861265 6.166792 14.040482 2.494532 98.068962 21.558258 4.549021 14.099338 2.578544 126.382057 29.561575 4.275214 14.147634 2.437763 37.180000 8.970341 4.144770 14.146704 2.572709 111.860718 27.041464 4.136637 14.060102 2.565368 114.903656 28.001387 4.103499 14.172613 2.236786 28.714285 7.194445 3.991174 14.268784 2.104800 44.830357 11.556100 3.879367 14.032671 2.514325 91.000000 23.817486 3.820723