Summary Page Created:Thu April 13, 2006 14:05 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700914

Instrument: ACIS Obs ID: 4832 Source: LBQS 0109-0128 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

acisf04832N002 full img2.fits acisf04832N002 cntr img2.fits

Summary Page Created:Thu April 13, 2006 14:05 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700914

Instrument: ACIS Obs ID: 4832 Source: LBQS 0109-0128 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T17:50:08 Date and time of file creation DATE-OBS 2004-11-04T10:00:47 Observation start date DATE-END 2004-11-04T12:19:05 Observation end date RA PNT 18.11975141666 Pointing RA DEC PNT -1.2145187590118 Pointing Dec ROLL PNT 308.91732983288 Pointing Roll RA TARG 18.115 Observer’s specified target RA DEC TARG -1.206083 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T18:04:00 Date and time of file creation DATE-OBS 2004-11-04T10:00:47 Observation start date DATE-END 2004-11-04T12:19:05 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 0109-0128 Source name TITLE Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line Quasars

Proposal title

OBSERVER Dr. Sarah Gallagher Principal investigator OBS ID 4832 Observation id SEQ NUM 700914 Sequence number RA NOM 18.11975141666 Nominal RA DEC NOM -1.2145187590118 Nominal Dec ROLL NOM 308.91732983288 Nominal Roll

Summary Page Created:Thu April 13, 2006 14:05 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700914

Instrument: ACIS Obs ID: 4832 Source: LBQS 0109-0128 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 18.359868 -1.411491 136.112961 26.590731 5.118812 18.263594 -1.488930 138.910294 28.981310 4.793099 18.252228 -1.472298 127.071426 31.319069 4.057318 18.317974 -1.443068 123.628571 30.743301 4.021317 18.282502 -1.476216 125.790695 31.363899 4.010684 18.328889 -1.437069 116.102989 31.538563 3.681302 18.001735 -1.279440 29.708334 8.159287 3.641045 18.315565 -1.449336 109.714287 31.132563 3.524101 18.338197 -1.389757 102.083336 29.061026 3.512723 18.125587 -1.235458 21.000000 6.150888 3.414141