Summary Page Created:Tue February 21, 2006 18:29 EST page: 1 of 3

Chandra X-ray Center Seq Num: 700916

Instrument: ACIS Obs ID: 4834 Source: LBQS 1203+1530 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

acisf04834N002 full img2.fits acisf04834N002 cntr img2.fits

Summary Page Created:Tue February 21, 2006 18:29 EST page: 2 of 3

Chandra X-ray Center Seq Num: 700916

Instrument: ACIS Obs ID: 4834 Source: LBQS 1203+1530 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-21T23:11:29 Date and time of file creation DATE-OBS 2005-02-05T16:09:53 Observation start date DATE-END 2005-02-05T18:36:18 Observation end date RA PNT 181.61156791411 Pointing RA DEC PNT 15.235540169156 Pointing Dec ROLL PNT 83.456020249693 Pointing Roll RA TARG 181.60875 Observer’s specified target RA DEC TARG 15.226333 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-21T23:27:58 Date and time of file creation DATE-OBS 2005-02-05T16:09:53 Observation start date DATE-END 2005-02-05T18:36:18 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 1203+1530 Source name TITLE Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line Quasars

Proposal title

OBSERVER Dr. Sarah Gallagher Principal investigator OBS ID 4834 Observation id SEQ NUM 700916 Sequence number RA NOM 181.61156791411 Nominal RA DEC NOM 15.235540169156 Nominal Dec ROLL NOM 83.456020249693 Nominal Roll

Summary Page Created:Tue February 21, 2006 18:29 EST page: 3 of 3

Chandra X-ray Center Seq Num: 700916

Instrument: ACIS Obs ID: 4834 Source: LBQS 1203+1530 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 181.814508 15.203938 254.300888 19.889414 12.785741 181.773730 15.273781 108.077499 12.735856 8.486081 181.584645 15.543620 247.667770 29.991217 8.258010 181.712012 15.529842 224.737549 29.026236 7.742566 181.608008 15.215095 60.428570 9.612507 6.286453 181.654906 15.535462 172.213394 31.076326 5.541626 181.581073 15.524042 151.742859 30.169306 5.029710 181.627404 15.162979 41.428570 8.414907 4.923236 181.710485 15.518900 143.659821 29.928284 4.800136 181.707696 15.486582 112.045456 24.996202 4.482499