Summary Page Created:Sun June 4, 2006 06:58 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700917

Instrument: ACIS Obs ID: 4835 Source: LBQS 1230+1705 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

acisf04835N002 full img2.fits acisf04835N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 06:58 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700917

Instrument: ACIS Obs ID: 4835 Source: LBQS 1230+1705 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-04T10:23:23 Date and time of file creation DATE-OBS 2004-02-04T14:14:49 Observation start date DATE-END 2004-02-04T16:28:42 Observation end date RA PNT 188.2975979305 Pointing RA DEC PNT 16.827331157426 Pointing Dec ROLL PNT 82.937929196035 Pointing Roll RA TARG 188.294583 Observer’s specified target RA DEC TARG 16.818111 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-04T10:57:31 Date and time of file creation DATE-OBS 2004-02-04T14:14:49 Observation start date DATE-END 2004-02-04T16:28:42 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 1230+1705 Source name TITLE Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line Quasars

Proposal title

OBSERVER Dr. Sarah Gallagher Principal investigator OBS ID 4835 Observation id SEQ NUM 700917 Sequence number RA NOM 188.2975979305 Nominal RA DEC NOM 16.827331157426 Nominal Dec ROLL NOM 82.937929196035 Nominal Roll

Summary Page Created:Sun June 4, 2006 06:58 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700917

Instrument: ACIS Obs ID: 4835 Source: LBQS 1230+1705 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 188.271663 17.025956 1088.065186 39.232998 27.733419 188.399678 17.121924 201.641190 26.990936 7.470700 188.351305 16.747831 81.113640 11.621946 6.979350 188.349385 16.895542 49.791668 9.176667 5.425899 188.271851 17.134818 108.787376 24.395823 4.459263 188.359067 17.127261 102.584717 26.816746 3.825398 188.386765 17.122064 116.318939 30.444008 3.820750 188.397750 17.104416 100.358925 27.487349 3.651095 188.399197 17.095705 81.541664 22.973000 3.549457 188.398680 17.083166 69.363640 20.532013 3.378316