Summary Page Created:Thu April 27, 2006 22:51 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700919

Instrument: ACIS Obs ID: 4837 Source: LBQS 2358+0216 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

acisf04837N002 full img2.fits acisf04837N002 cntr img2.fits

Summary Page Created:Thu April 27, 2006 22:51 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700919

Instrument: ACIS Obs ID: 4837 Source: LBQS 2358+0216 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-28T02:23:48 Date and time of file creation DATE-OBS 2004-07-18T23:54:46 Observation start date DATE-END 2004-07-19T02:04:33 Observation end date RA PNT 0.3380308322593 Pointing RA DEC PNT 2.5604102969489 Pointing Dec ROLL PNT 114.63452779104 Pointing Roll RA TARG 0.340417 Observer’s specified target RA DEC TARG 2.551139 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 154.41346741 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-28T02:50:38 Date and time of file creation DATE-OBS 2004-07-18T23:54:46 Observation start date DATE-END 2004-07-19T02:04:33 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 2358+0216 Source name TITLE Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line Quasars

Proposal title

OBSERVER Dr. Sarah Gallagher Principal investigator OBS ID 4837 Observation id SEQ NUM 700919 Sequence number RA NOM 0.3380308322593 Nominal RA DEC NOM 2.5604102969489 Nominal Dec ROLL NOM 114.63452779104 Nominal Roll

Summary Page Created:Thu April 27, 2006 22:51 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700919

Instrument: ACIS Obs ID: 4837 Source: LBQS 2358+0216 PI: Dr. Sarah Gallagher Title: Constraining the Hard-X-ray Through Submm SEDs of a Complete Sample of Broad Absorption Line

Quasars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 0.530622 2.595628 150.208328 15.167193 9.903502 0.265733 2.861494 183.362122 29.011858 6.320248 0.155594 2.814096 128.162796 23.931890 5.355314 0.253403 2.854881 162.325577 31.708483 5.119311 0.290104 2.719887 40.034481 8.465511 4.729128 0.285494 2.572833 31.079546 7.054573 4.405589 0.261408 2.584318 42.714287 9.762677 4.375264 0.163388 2.795120 119.469643 27.994532 4.267606 0.459763 2.641428 34.556820 8.234281 4.196702 0.171536 2.768157 84.727272 20.561775 4.120621