Summary Page Created:Mon April 24, 2006 23:53 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 900345

Instrument: ACIS Obs ID: 5039 Source: MS30.7 off PI: DR. Joel Bregman Title: The Missing Baryons in the Local Group

acisf05039N002 full img2.fits acisf05039N002 cntr img2.fits

Summary Page Created:Mon April 24, 2006 23:53 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 900345

Instrument: ACIS Obs ID: 5039 Source: MS30.7 off PI: DR. Joel Bregman Title: The Missing Baryons in the Local Group

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-25T02:34:11 Date and time of file creation DATE-OBS 2004-08-21T00:09:56 Observation start date DATE-END 2004-08-21T14:21:59 Observation end date RA PNT 3.7781774060914 Pointing RA DEC PNT -27.451238769105 Pointing Dec ROLL PNT 70.626420630976 Pointing Roll RA TARG 3.772833 Observer’s specified target RA DEC TARG -27.459639 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-04-25T03:51:12 Date and time of file creation DATE-OBS 2004-08-21T00:09:56 Observation start date DATE-END 2004-08-21T14:21:59 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT MS30.7 off Source name TITLE The Missing Baryons in the Local Group

Proposal title

OBSERVER DR. Joel Bregman Principal investigator OBS ID 5039 Observation id SEQ NUM 900345 Sequence number RA NOM 3.7781774060914 Nominal RA DEC NOM -27.451238769105 Nominal Dec ROLL NOM 70.626420630976 Nominal Roll

Summary Page Created:Mon April 24, 2006 23:53 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 900345

Instrument: ACIS Obs ID: 5039 Source: MS30.7 off PI: DR. Joel Bregman Title: The Missing Baryons in the Local Group

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 3.954199 -27.183336 1881.043213 85.815125 21.919718 3.824660 -27.144631 1365.970093 76.352356 17.890347 3.910342 -27.170219 1257.465088 94.602913 13.292034 3.844253 -27.150243 1097.245850 95.812157 11.452053 3.820016 -27.157100 943.402649 82.539413 11.429723 3.885669 -27.162827 979.273193 88.067314 11.119598 3.952362 -27.197814 907.450867 83.190025 10.908170 3.865329 -27.156802 961.321411 88.779648 10.828173 3.815981 -27.167398 845.750000 80.302956 10.531991 3.932407 -27.176912 977.804016 93.832283 10.420763