Summary Page Created:Fri April 7, 2006 07:00 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 300150

Instrument: ACIS Obs ID: 5434 Source: NGC 6838 (M71) PI: Dr. Ronald Elsner Title: Sensitive X-ray surveys of the nearby globular clusters NGC 6544, NGC 6838 (M71), and NGC 6656 (M22)

acisf05434N002 full img2.fits acisf05434N002 cntr img2.fits

Summary Page Created:Fri April 7, 2006 07:00 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 300150

Instrument: ACIS Obs ID: 5434 Source: NGC 6838 (M71) PI: Dr. Ronald Elsner Title: Sensitive X-ray surveys of the nearby globular clusters NGC 6544, NGC 6838 (M71), and NGC 6656 (M22)

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T09:38:24 Date and time of file creation DATE-OBS 2004-12-20T15:19:48 Observation start date DATE-END 2004-12-21T06:42:01 Observation end date RA PNT 298.44923711234 Pointing RA DEC PNT 18.771514038489 Pointing Dec ROLL PNT 324.69872229796 Pointing Roll RA TARG 298.442083 Observer’s specified target RA DEC TARG 18.778389 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T10:58:55 Date and time of file creation DATE-OBS 2004-12-20T15:19:48 Observation start date DATE-END 2004-12-21T06:42:01 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23678 Detector GRATING NONE Grating OBJECT NGC 6838 (M71) Source name TITLE Sensitive X-ray surveys of the nearby globular clusters NGC 6544, NGC 6838 (M71), and NGC 6656 (M22)

Proposal title

OBSERVER Dr. Ronald Elsner Principal investigator OBS ID 5434 Observation id SEQ NUM 300150 Sequence number RA NOM 298.44923711234 Nominal RA DEC NOM 18.771514038489 Nominal Dec ROLL NOM 324.69872229796 Nominal Roll

Summary Page Created:Fri April 7, 2006 07:00 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 300150

Instrument: ACIS Obs ID: 5434 Source: NGC 6838 (M71) PI: Dr. Ronald Elsner Title: Sensitive X-ray surveys of the nearby globular clusters NGC 6544, NGC 6838 (M71), and NGC 6656 (M22)

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 298.264685 18.866713 7528.430176 95.443405 78.878479 298.511910 18.714038 723.625000 30.347660 23.844507 298.434937 18.769482 307.000000 20.039467 15.319769 298.309681 18.865805 340.597504 26.369581 12.916303 298.295266 18.838483 236.467499 22.722721 10.406654 298.359818 18.665138 142.083328 16.912203 8.401232 298.412212 18.762952 100.571426 12.190017 8.250311 298.445956 18.740789 87.571426 11.588956 7.556456 298.427608 18.763089 88.285713 11.782321 7.493066 298.453996 18.787197 78.428574 11.785429 6.654706