Summary Page Created:Sat November 24, 2007 14:31 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400451

Instrument: HRC Obs ID: 6191 Source: GC-2 PI: Dr. Rudy Wijnands Title: Monitoring observations of the Galactic Center region

hrcf06191N003 full img2.fits hrcf06191N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 14:31 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400451

Instrument: HRC Obs ID: 6191 Source: GC-2 PI: Dr. Rudy Wijnands Title: Monitoring observations of the Galactic Center region

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T19:17:52 Date and time of file creation DATE-OBS 2005-10-20T18:20:02 Observation start date DATE-END 2005-10-20T20:03:02 Observation end date RA PNT 266.41422387873 Pointing RA DEC PNT -29.006756942214 Pointing Dec ROLL PNT 265.23871128549 Pointing Roll RA TARG 266.416667 Observer’s specified target RA DEC TARG -29.003056 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T19:29:56 Date and time of file creation DATE-OBS 2005-10-20T18:20:02 Observation start date DATE-END 2005-10-20T20:03:02 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT GC-2 Source name TITLE Monitoring observations of the Galactic Center region

Proposal tit

OBSERVER Dr. Rudy Wijnands Principal investigator OBS ID 6191 Observation id SEQ NUM 400451 Sequence number RA NOM 266.41422387873 Nominal RA DEC NOM -29.006756942214 Nominal Dec ROLL NOM 265.23871128549 Nominal Roll

Summary Page Created:Sat November 24, 2007 14:31 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400451

Instrument: HRC Obs ID: 6191 Source: GC-2 PI: Dr. Rudy Wijnands Title: Monitoring observations of the Galactic Center region

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 266.663902 -28.900358 104.083336 18.900991 5.506765 266.508272 -28.717906 82.373215 21.056496 3.912010 266.467283 -29.282089 80.916664 21.258785 3.806270 266.259715 -28.961118 33.034092 8.891443 3.715268 266.076419 -29.037551 75.650002 21.372023 3.539674 266.374493 -29.117960 28.062069 8.234051 3.408051 266.443160 -29.302926 72.926788 21.780348 3.348284 266.759062 -28.974364 67.041069 20.057545 3.342437 266.347372 -29.309178 76.172325 23.870323 3.191089 266.703254 -28.917301 52.329544 16.440771 3.182913