Summary Page Created:Sat November 24, 2007 09:56 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400456

Instrument: HRC Obs ID: 6196 Source: GC-8 PI: Dr. Rudy Wijnands Title: Monitoring observations of the Galactic Center region

hrcf06196N003 full img2.fits hrcf06196N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 09:56 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400456

Instrument: HRC Obs ID: 6196 Source: GC-8 PI: Dr. Rudy Wijnands Title: Monitoring observations of the Galactic Center region

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T14:41:20 Date and time of file creation DATE-OBS 2005-06-05T08:10:04 Observation start date DATE-END 2005-06-05T09:42:32 Observation end date RA PNT 265.97037971049 Pointing RA DEC PNT -29.003844321317 Pointing Dec ROLL PNT 62.886170548523 Pointing Roll RA TARG 265.967083 Observer’s specified target RA DEC TARG -29.006389 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T14:55:01 Date and time of file creation DATE-OBS 2005-06-05T08:10:04 Observation start date DATE-END 2005-06-05T09:42:32 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT GC-8 Source name TITLE Monitoring observations of the Galactic Center region

Proposal tit

OBSERVER Dr. Rudy Wijnands Principal investigator OBS ID 6196 Observation id SEQ NUM 400456 Sequence number RA NOM 265.97037971049 Nominal RA DEC NOM -29.003844321317 Nominal Dec ROLL NOM 62.886170548523 Nominal Roll

Summary Page Created:Sat November 24, 2007 09:56 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400456

Instrument: HRC Obs ID: 6196 Source: GC-8 PI: Dr. Rudy Wijnands Title: Monitoring observations of the Galactic Center region

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 265.962067 -28.778597 79.779259 18.758354 4.252999 265.821267 -29.307575 111.846413 27.510565 4.065580 266.290699 -29.074008 85.041664 21.200848 4.011239 265.622752 -28.872686 93.501991 24.752268 3.777512 265.676533 -29.036228 63.613792 16.930973 3.757244 265.859131 -29.299482 84.452675 22.924026 3.684025 266.043586 -28.729413 74.708336 21.371473 3.495703 266.227531 -29.195926 81.033928 23.764416 3.409885 266.066551 -29.242039 58.662067 17.217375 3.407144 265.833050 -29.305185 85.647842 25.244511 3.392731