Summary Page Created:Sat November 24, 2007 11:58 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500509

Instrument: HRC Obs ID: 5515 Source: PSR B1509-58 PI: Dr. Steven Murray Title: The Surface Temperature of Isolated Neutron Stars

hrcf05515N003 full img2.fits hrcf05515N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 11:58 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500509

Instrument: HRC Obs ID: 5515 Source: PSR B1509-58 PI: Dr. Steven Murray Title: The Surface Temperature of Isolated Neutron Stars

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T15:39:37 Date and time of file creation DATE-OBS 2005-06-13T00:13:17 Observation start date DATE-END 2005-06-13T13:10:43 Observation end date RA PNT 228.48437724611 Pointing RA DEC PNT -59.139702236792 Pointing Dec ROLL PNT 312.68239668185 Pointing Roll RA TARG 228.481667 Observer’s specified target RA DEC TARG -59.135833 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T16:55:20 Date and time of file creation DATE-OBS 2005-06-13T00:13:17 Observation start date DATE-END 2005-06-13T13:10:43 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT PSR B1509-58 Source name TITLE The Surface Temperature of Isolated Neutron Stars

Proposal title

OBSERVER Dr. Steven Murray Principal investigator OBS ID 5515 Observation id SEQ NUM 500509 Sequence number RA NOM 228.48437724611 Nominal RA DEC NOM -59.139702236792 Nominal Dec ROLL NOM 312.68239668185 Nominal Roll

Summary Page Created:Sat November 24, 2007 11:58 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500509

Instrument: HRC Obs ID: 5515 Source: PSR B1509-58 PI: Dr. Steven Murray Title: The Surface Temperature of Isolated Neutron Stars

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 228.481725 -59.135878 10620.375000 111.387665 95.346054 228.456969 -59.026150 996.848267 43.965458 22.673443 228.444404 -59.013591 1544.250000 74.296486 20.784967 228.422150 -59.012673 883.375000 51.408955 17.183290 228.396901 -59.025725 621.340881 41.717701 14.893940 228.414569 -59.046174 520.432495 37.869728 13.742704 228.309793 -59.059246 460.204559 33.986214 13.540918 228.321605 -59.028045 386.082153 32.149857 12.008829 228.443829 -58.995839 369.931824 36.827351 10.045029 227.977599 -59.343991 747.859680 81.126183 9.218475