Summary Page Created:Tue February 21, 2006 19:29 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500527

Instrument: ACIS Obs ID: 5533 Source: 3EG J2020+4017 PI: Dr. Martin Weisskopf Title: A Search for the X-ray counterpart of the Unidentified Gamma-Ray source 3EG J2020+4017

acisf05533N002 full img2.fits acisf05533N002 cntr img2.fits

Summary Page Created:Tue February 21, 2006 19:29 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500527

Instrument: ACIS Obs ID: 5533 Source: 3EG J2020+4017 PI: Dr. Martin Weisskopf Title: A Search for the X-ray counterpart of the Unidentified Gamma-Ray source 3EG J2020+4017

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-22T00:10:22 Date and time of file creation DATE-OBS 2005-02-06T17:50:17 Observation start date DATE-END 2005-02-06T22:06:58 Observation end date RA PNT 305.26015653503 Pointing RA DEC PNT 40.29619833868 Pointing Dec ROLL PNT 17.632797919745 Pointing Roll RA TARG 305.254167 Observer’s specified target RA DEC TARG 40.296667 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-22T00:28:30 Date and time of file creation DATE-OBS 2005-02-06T17:50:17 Observation start date DATE-END 2005-02-06T22:06:58 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-0123 Detector GRATING NONE Grating OBJECT 3EG J2020+4017 Source name TITLE A Search for the X-ray counterpart of the Unidentified Gamma- Ray source 3EG J2020+4017

Proposal title

OBSERVER Dr. Martin Weisskopf Principal investigator OBS ID 5533 Observation id SEQ NUM 500527 Sequence number RA NOM 305.26015653503 Nominal RA DEC NOM 40.29619833868 Nominal Dec ROLL NOM 17.632797919745 Nominal Roll

Summary Page Created:Tue February 21, 2006 19:29 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500527

Instrument: ACIS Obs ID: 5533 Source: 3EG J2020+4017 PI: Dr. Martin Weisskopf Title: A Search for the X-ray counterpart of the Unidentified Gamma-Ray source 3EG J2020+4017

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 305.228605 40.405156 56.282501 9.962269 5.649566 305.385430 40.416543 45.564999 10.341516 4.406027 305.267132 40.360967 32.318180 7.644539 4.227617 305.388068 40.266121 29.318182 7.411719 3.955652 305.140513 40.307762 28.875000 7.385937 3.909457 305.303801 40.401602 22.692499 6.969604 3.255924 305.334831 40.291102 18.000000 5.600033 3.214267 305.191232 40.342101 19.000000 5.949306 3.193650