Summary Page Created:Wed February 22, 2006 17:35 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500598

Instrument: ACIS Obs ID: 6224 Source: SGR 1806-20 PI: Dr Derek Fox Title: The X-ray Fluence of the SGR 1806-20 Hyperflare

acisf06224N002 full img2.fits acisf06224N002 cntr img2.fits

Summary Page Created:Wed February 22, 2006 17:35 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500598

Instrument: ACIS Obs ID: 6224 Source: SGR 1806-20 PI: Dr Derek Fox Title: The X-ray Fluence of the SGR 1806-20 Hyperflare

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-22T21:37:53 Date and time of file creation DATE-OBS 2005-02-09T07:01:09 Observation start date DATE-END 2005-02-09T12:49:13 Observation end date RA PNT 272.27745777531 Pointing RA DEC PNT -20.534785184203 Pointing Dec ROLL PNT 88.545276971771 Pointing Roll RA TARG 272.16375 Observer’s specified target RA DEC TARG -20.410833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-22T22:34:11 Date and time of file creation DATE-OBS 2005-02-09T07:01:09 Observation start date DATE-END 2005-02-09T12:49:13 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT SGR 1806-20 Source name TITLE The X-ray Fluence of the SGR 1806-20 Hyperflare

Proposal title

OBSERVER Dr Derek Fox Principal investigator OBS ID 6224 Observation id SEQ NUM 500598 Sequence number RA NOM 272.27745777531 Nominal RA DEC NOM -20.534785184203 Nominal Dec ROLL NOM 88.545276971771 Nominal Roll

Summary Page Created:Wed February 22, 2006 17:35 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500598

Instrument: ACIS Obs ID: 6224 Source: SGR 1806-20 PI: Dr Derek Fox Title: The X-ray Fluence of the SGR 1806-20 Hyperflare

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 272.164170 -20.410804 7055.437500 100.833328 69.971283 272.163262 -20.411126 3307.000000 96.509972 34.265888 271.945193 -20.626101 554.466064 47.144089 11.761095 271.949705 -20.508999 470.096344 45.067623 10.430911 271.949214 -20.547802 430.262451 52.340961 8.220378 271.948461 -20.599942 394.621277 54.156574 7.286673 271.975177 -20.629547 311.910706 46.550491 6.700482 271.997108 -20.631871 247.750000 41.938023 5.907527 272.189120 -20.601607 57.487499 9.734102 5.905783 271.948474 -20.580504 311.996674 52.979195 5.889041