Summary Page Created:Wed March 15, 2006 22:04 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600470

Instrument: ACIS Obs ID: 5951 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

acisf05951N002 full img2.fits acisf05951N002 cntr img2.fits

Summary Page Created:Wed March 15, 2006 22:04 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600470

Instrument: ACIS Obs ID: 5951 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-16T00:18:20 Date and time of file creation DATE-OBS 2005-07-27T19:08:16 Observation start date DATE-END 2005-07-28T08:27:48 Observation end date RA PNT 266.41512005582 Pointing RA DEC PNT -29.01219086044 Pointing Dec ROLL PNT 275.97432623642 Pointing Roll RA TARG 266.416667 Observer’s specified target RA DEC TARG -29.007778 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-16T03:02:05 Date and time of file creation DATE-OBS 2005-07-27T19:08:16 Observation start date DATE-END 2005-07-28T08:27:48 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT Sgr A* Source name TITLE Simultaneous Gamma-Ray to Sub- Millimeter Monitoring of Sagittarius A*

Proposal title

OBSERVER Dr. Frederick Baganoff Principal investigator OBS ID 5951 Observation id SEQ NUM 600470 Sequence number RA NOM 266.41512005582 Nominal RA DEC NOM -29.01219086044 Nominal Dec ROLL NOM 275.97432623642 Nominal Roll

Summary Page Created:Wed March 15, 2006 22:04 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600470

Instrument: ACIS Obs ID: 5951 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 266.259882 -28.913926 24136.242188 167.505417 144.092300 266.374912 -29.117926 291.670013 21.705828 13.437406 266.400586 -28.944027 238.142853 18.411119 12.934730 266.422931 -28.970750 160.428574 15.103994 10.621599 266.767308 -29.019396 427.348846 41.676643 10.253917 266.431001 -28.983467 140.000000 14.102929 9.927015 266.398175 -29.023339 113.285713 12.892590 8.786886 266.439695 -28.974565 147.857147 17.117561 8.637746 266.415808 -29.005645 191.000000 22.529152 8.477904 266.433034 -29.082439 104.714287 12.812667 8.172716