Summary Page Created:Wed March 15, 2006 22:08 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600472

Instrument: ACIS Obs ID: 5953 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

acisf05953N002 full img2.fits acisf05953N002 cntr img2.fits

Summary Page Created:Wed March 15, 2006 22:08 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600472

Instrument: ACIS Obs ID: 5953 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-16T01:41:08 Date and time of file creation DATE-OBS 2005-07-30T19:38:31 Observation start date DATE-END 2005-07-31T09:12:32 Observation end date RA PNT 266.41505683761 Pointing RA DEC PNT -29.012183080377 Pointing Dec ROLL PNT 275.28288647841 Pointing Roll RA TARG 266.416667 Observer’s specified target RA DEC TARG -29.007778 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-16T03:06:48 Date and time of file creation DATE-OBS 2005-07-30T19:38:31 Observation start date DATE-END 2005-07-31T09:12:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT Sgr A* Source name TITLE Simultaneous Gamma-Ray to Sub- Millimeter Monitoring of Sagittarius A*

Proposal title

OBSERVER Dr. Frederick Baganoff Principal investigator OBS ID 5953 Observation id SEQ NUM 600472 Sequence number RA NOM 266.41505683761 Nominal RA DEC NOM -29.012183080377 Nominal Dec ROLL NOM 275.28288647841 Nominal Roll

Summary Page Created:Wed March 15, 2006 22:08 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600472

Instrument: ACIS Obs ID: 5953 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 266.259857 -28.913913 11146.882812 114.522606 97.333473 266.422919 -28.970779 234.571426 17.831293 13.155044 266.375205 -29.117711 289.952515 22.070477 13.137573 266.400647 -28.944044 217.000000 16.778992 12.932838 266.416894 -29.007802 269.142853 26.650734 10.098891 266.409566 -29.013509 145.714279 15.274434 9.539750 266.433039 -29.082342 121.428574 13.637222 8.904202 266.415782 -29.005678 185.428574 22.038279 8.413932 266.767624 -29.025262 362.395355 43.368233 8.356239 266.322050 -29.106956 138.568176 17.559618 7.891299