Summary Page Created:Tue April 4, 2006 18:33 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600427

Instrument: ACIS Obs ID: 6131 Source: M84 PI: Dr. Christine Jones Title: The Exploding Galaxies M84 and M89

acisf06131N002 full img2.fits acisf06131N002 cntr img2.fits

Summary Page Created:Tue April 4, 2006 18:33 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600427

Instrument: ACIS Obs ID: 6131 Source: M84 PI: Dr. Christine Jones Title: The Exploding Galaxies M84 and M89

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-04T21:03:12 Date and time of file creation DATE-OBS 2005-11-07T11:25:22 Observation start date DATE-END 2005-11-07T23:38:41 Observation end date RA PNT 186.28027812094 Pointing RA DEC PNT 12.902158030837 Pointing Dec ROLL PNT 51.956634724659 Pointing Roll RA TARG 186.265833 Observer’s specified target RA DEC TARG 12.886944 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-04T22:31:58 Date and time of file creation DATE-OBS 2005-11-07T11:25:22 Observation start date DATE-END 2005-11-07T23:38:41 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M84 Source name TITLE The Exploding Galaxies M84 and M89 Proposal title

OBSERVER Dr. Christine Jones Principal investigator OBS ID 6131 Observation id SEQ NUM 600427 Sequence number RA NOM 186.28027812094 Nominal RA DEC NOM 12.902158030837 Nominal Dec ROLL NOM 51.956634724659 Nominal Roll

Summary Page Created:Tue April 4, 2006 18:33 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600427

Instrument: ACIS Obs ID: 6131 Source: M84 PI: Dr. Christine Jones Title: The Exploding Galaxies M84 and M89

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 186.299640 12.864921 1292.571411 39.705589 32.553890 186.521382 13.104715 964.219299 69.396683 13.894314 186.265643 12.886930 461.714294 33.842205 13.643150 186.422297 13.176593 930.607971 69.281433 13.432284 186.315298 12.744761 186.387497 18.487600 10.081758 186.475934 13.040107 554.588257 55.142216 10.057416 186.428078 12.692410 236.751724 28.613426 8.274148 186.312813 12.934078 99.428574 12.727378 7.812181 186.446512 13.160571 508.993744 67.650284 7.523897 186.491361 13.060357 457.568176 60.841347 7.520678