Summary Page Created:Wed March 8, 2006 12:36 EST page: 1 of 3

Chandra X-ray Center Seq Num: 701074

Instrument: ACIS Obs ID: 5651 Source: SDSS J130158.04-014212.1 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

acisf05651N002 full img2.fits acisf05651N002 cntr img2.fits

Summary Page Created:Wed March 8, 2006 12:36 EST page: 2 of 3

Chandra X-ray Center Seq Num: 701074

Instrument: ACIS Obs ID: 5651 Source: SDSS J130158.04-014212.1 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-08T16:50:42 Date and time of file creation DATE-OBS 2005-06-02T23:44:51 Observation start date DATE-END 2005-06-03T01:07:06 Observation end date RA PNT 195.48597808412 Pointing RA DEC PNT -1.7111615493904 Pointing Dec ROLL PNT 244.68966694686 Pointing Roll RA TARG 195.491667 Observer’s specified target RA DEC TARG -1.703361 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-08T17:35:21 Date and time of file creation DATE-OBS 2005-06-02T23:44:51 Observation start date DATE-END 2005-06-03T01:07:06 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-2367 Detector GRATING NONE Grating OBJECT SDSS J130158.04-014212.1 Source name TITLE The Spectral Energy Distribution and Fe II Emission in Intermediate- Redshift Narrow-line Seyfert 1 Galaxies

Proposal title

OBSERVER PROF. KAREN LEIGHLY Principal investigator OBS ID 5651 Observation id SEQ NUM 701074 Sequence number RA NOM 195.48597808412 Nominal RA DEC NOM -1.7111615493904 Nominal Dec ROLL NOM 244.68966694686 Nominal Roll

Summary Page Created:Wed March 8, 2006 12:36 EST page: 3 of 3

Chandra X-ray Center Seq Num: 701074

Instrument: ACIS Obs ID: 5651 Source: SDSS J130158.04-014212.1 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 195.491849 -1.703326 133.857147 13.457481 9.946671 195.584841 -1.638496 23.318182 6.917390 3.370951