Summary Page Created:Tue February 21, 2006 17:13 EST page: 1 of 3

Chandra X-ray Center Seq Num: 701075

Instrument: ACIS Obs ID: 5652 Source: SDSS J011651.54-103424.3 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

acisf05652N002 full img2.fits acisf05652N002 cntr img2.fits

Summary Page Created:Tue February 21, 2006 17:13 EST page: 2 of 3

Chandra X-ray Center Seq Num: 701075

Instrument: ACIS Obs ID: 5652 Source: SDSS J011651.54-103424.3 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-21T21:48:41 Date and time of file creation DATE-OBS 2005-02-02T15:44:20 Observation start date DATE-END 2005-02-02T18:34:04 Observation end date RA PNT 19.215193349262 Pointing RA DEC PNT -10.583073321011 Pointing Dec ROLL PNT 283.52235996456 Pointing Roll RA TARG 19.214583 Observer’s specified target RA DEC TARG -10.573417 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-21T22:12:27 Date and time of file creation DATE-OBS 2005-02-02T15:44:20 Observation start date DATE-END 2005-02-02T18:34:04 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-2367 Detector GRATING NONE Grating OBJECT SDSS J011651.54-103424.3 Source name TITLE The Spectral Energy Distribution and Fe II Emission in Intermediate- Redshift Narrow-line Seyfert 1 Galaxies

Proposal title

OBSERVER PROF. KAREN LEIGHLY Principal investigator OBS ID 5652 Observation id SEQ NUM 701075 Sequence number RA NOM 19.215193349262 Nominal RA DEC NOM -10.583073321011 Nominal Dec ROLL NOM 283.52235996456 Nominal Roll

Summary Page Created:Tue February 21, 2006 17:13 EST page: 3 of 3

Chandra X-ray Center Seq Num: 701075

Instrument: ACIS Obs ID: 5652 Source: SDSS J011651.54-103424.3 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 19.025445 -10.615620 74.125000 12.338092 6.007817 19.168674 -10.532852 37.428570 8.136259 4.600219 19.045500 -10.727061 40.762634 10.601869 3.844854 19.084278 -10.684893 32.872501 9.171071 3.584369 19.017674 -10.501466 24.541529 7.682425 3.194503 19.082535 -10.685518 29.110344 9.265884 3.141670 19.243121 -10.642682 20.318182 6.653157 3.053916