Summary Page Created:Tue April 4, 2006 08:23 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 701077

Instrument: ACIS Obs ID: 5654 Source: SDSS J032349.53-002949.7 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

acisf05654N002 full img2.fits acisf05654N002 cntr img2.fits

Summary Page Created:Tue April 4, 2006 08:23 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 701077

Instrument: ACIS Obs ID: 5654 Source: SDSS J032349.53-002949.7 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-04T11:56:24 Date and time of file creation DATE-OBS 2005-10-30T15:55:59 Observation start date DATE-END 2005-10-30T18:38:19 Observation end date RA PNT 50.958315896192 Pointing RA DEC PNT -0.49730657496921 Pointing Dec ROLL PNT 47.193419819606 Pointing Roll RA TARG 50.95625 Observer’s specified target RA DEC TARG -0.497139 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-04T12:22:22 Date and time of file creation DATE-OBS 2005-10-30T15:55:59 Observation start date DATE-END 2005-10-30T18:38:19 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-2367 Detector GRATING NONE Grating OBJECT SDSS J032349.53-002949.7 Source name TITLE The Spectral Energy Distribution and Fe II Emission in Intermediate- Redshift Narrow-line Seyfert 1 Galaxies

Proposal title

OBSERVER PROF. KAREN LEIGHLY Principal investigator OBS ID 5654 Observation id SEQ NUM 701077 Sequence number RA NOM 50.958315896192 Nominal RA DEC NOM -0.49730657496921 Nominal Dec ROLL NOM 47.193419819606 Nominal Roll

Summary Page Created:Tue April 4, 2006 08:23 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 701077

Instrument: ACIS Obs ID: 5654 Source: SDSS J032349.53-002949.7 PI: PROF. KAREN LEIGHLY Title: The Spectral Energy Distribution and Fe II Emission in Intermediate-Redshift Narrow-line Seyfert 1

Galaxies

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 50.956443 -0.497165 170.428574 14.587475 11.683213 51.096662 -0.703793 185.500000 19.110500 9.706706 51.096762 -0.705371 174.503448 19.258560 9.061085 51.008744 -0.509846 82.397728 10.828991 7.608994 50.947297 -0.530921 22.714285 6.679774 3.400457 50.935849 -0.552958 17.000000 5.488740 3.097250 51.070623 -0.655816 23.708334 7.717201 3.072141 51.009617 -0.413468 19.238636 6.371428 3.019517 50.907716 -0.502966 19.238636 6.371428 3.019517