Summary Page Created:Thu February 16, 2006 23:30 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800502

Instrument: ACIS Obs ID: 5789 Source: HCG 37 PI: Prof Trevor Ponman Title: HI-Deficient Ultracompact Groups

acisf05789N002 full img2.fits acisf05789N002 cntr img2.fits

Summary Page Created:Thu February 16, 2006 23:30 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800502

Instrument: ACIS Obs ID: 5789 Source: HCG 37 PI: Prof Trevor Ponman Title: HI-Deficient Ultracompact Groups

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-17T04:07:09 Date and time of file creation DATE-OBS 2005-01-13T09:44:05 Observation start date DATE-END 2005-01-13T15:30:04 Observation end date RA PNT 138.39704216771 Pointing RA DEC PNT 30.023758121292 Pointing Dec ROLL PNT 106.83403896511 Pointing Roll RA TARG 138.398333 Observer’s specified target RA DEC TARG 30.014167 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 154.09092712 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-17T04:29:17 Date and time of file creation DATE-OBS 2005-01-13T09:44:05 Observation start date DATE-END 2005-01-13T15:30:04 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-35678 Detector GRATING NONE Grating OBJECT HCG 37 Source name TITLE HI-Deficient Ultracompact Groups Proposal title OBSERVER Prof Trevor Ponman Principal investigator OBS ID 5789 Observation id SEQ NUM 800502 Sequence number RA NOM 138.39704216771 Nominal RA DEC NOM 30.023758121292 Nominal Dec ROLL NOM 106.83403896511 Nominal Roll

Summary Page Created:Thu February 16, 2006 23:30 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800502

Instrument: ACIS Obs ID: 5789 Source: HCG 37 PI: Prof Trevor Ponman Title: HI-Deficient Ultracompact Groups

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 138.384410 29.929674 1519.102295 42.975544 35.348064 138.357980 30.080379 431.142853 24.268425 17.765589 138.459457 29.953846 315.750000 20.797380 15.182199 138.364475 30.331223 397.202667 41.720810 9.520492 138.230654 30.298043 358.833893 42.105804 8.522195 138.264596 30.306286 338.122314 43.027912 7.858209 138.362260 30.093197 78.000000 11.452211 6.810912 138.392639 30.043650 57.714287 9.226545 6.255243 138.378689 30.294342 227.818176 36.674591 6.211881 138.376245 30.301752 233.541672 39.285709 5.944698