Summary Page Created:Fri March 17, 2006 16:05 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800508

Instrument: ACIS Obs ID: 6263 Source: A2063 PI: Dr. Craig Sarazin Title: The Interaction between Cluster Central Radio Sources and Cooling Flows

acisf06263N002 full img2.fits acisf06263N002 cntr img2.fits

Summary Page Created:Fri March 17, 2006 16:05 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800508

Instrument: ACIS Obs ID: 6263 Source: A2063 PI: Dr. Craig Sarazin Title: The Interaction between Cluster Central Radio Sources and Cooling Flows

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-17T20:29:05 Date and time of file creation DATE-OBS 2005-03-29T20:17:06 Observation start date DATE-END 2005-03-30T01:27:30 Observation end date RA PNT 230.7682918964 Pointing RA DEC PNT 8.6292722055454 Pointing Dec ROLL PNT 105.15721422786 Pointing Roll RA TARG 230.772083 Observer’s specified target RA DEC TARG 8.608861 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-17T21:04:14 Date and time of file creation DATE-OBS 2005-03-29T20:17:06 Observation start date DATE-END 2005-03-30T01:27:30 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-35678 Detector GRATING NONE Grating OBJECT A2063 Source name TITLE The Interaction between Cluster Central Radio Sources and Cooling Flows

Proposal title

OBSERVER Dr. Craig Sarazin Principal investigator OBS ID 6263 Observation id SEQ NUM 800508 Sequence number RA NOM 230.7682918964 Nominal RA DEC NOM 8.6292722055454 Nominal Dec ROLL NOM 105.15721422786 Nominal Roll

Summary Page Created:Fri March 17, 2006 16:05 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800508

Instrument: ACIS Obs ID: 6263 Source: A2063 PI: Dr. Craig Sarazin Title: The Interaction between Cluster Central Radio Sources and Cooling Flows

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 230.800896 8.549920 2823.083252 59.417263 47.512848 230.712892 8.705386 280.829559 19.177496 14.643703 230.630020 8.904511 365.056488 41.740055 8.745951 230.789107 8.647458 99.857140 12.001149 8.320631 230.747564 8.937035 366.102997 44.204628 8.282006 230.916514 8.567766 123.232498 15.076509 8.173808 230.707802 8.612398 83.954544 11.576716 7.252017 230.718526 8.626598 85.000000 11.784993 7.212563 230.635719 8.880557 283.041656 41.556328 6.811037 230.642377 8.910362 295.644531 43.534874 6.790981