Summary Page Created:Sat November 24, 2007 01:29 EST page: 1 of 3

Chandra X-ray Center Seq Num: 900394

Instrument: HRC Obs ID: 6093 Source: GX13+1 PI: Dr. Randall Smith Title: Filling in the X-ray Halo around GX13+1

hrcf06093N003 full img2.fits hrcf06093N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 01:29 EST page: 2 of 3

Chandra X-ray Center Seq Num: 900394

Instrument: HRC Obs ID: 6093 Source: GX13+1 PI: Dr. Randall Smith Title: Filling in the X-ray Halo around GX13+1

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T06:04:18 Date and time of file creation DATE-OBS 2005-02-08T19:51:48 Observation start date DATE-END 2005-02-08T22:47:34 Observation end date RA PNT 273.63370677342 Pointing RA DEC PNT -17.153533334794 Pointing Dec ROLL PNT 85.455257661801 Pointing Roll RA TARG 273.631667 Observer’s specified target RA DEC TARG -17.157417 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T06:28:03 Date and time of file creation DATE-OBS 2005-02-08T19:51:48 Observation start date DATE-END 2005-02-08T22:47:34 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT GX13+1 Source name TITLE Filling in the X-ray Halo around GX13+1

Proposal title

OBSERVER Dr. Randall Smith Principal investigator OBS ID 6093 Observation id SEQ NUM 900394 Sequence number RA NOM 273.63370677342 Nominal RA DEC NOM -17.153533334794 Nominal Dec ROLL NOM 85.455257661801 Nominal Roll

Summary Page Created:Sat November 24, 2007 01:29 EST page: 3 of 3

Chandra X-ray Center Seq Num: 900394

Instrument: HRC Obs ID: 6093 Source: GX13+1 PI: Dr. Randall Smith Title: Filling in the X-ray Halo around GX13+1

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 273.629050 -17.156608 286972.843750 580.489807 494.363251 273.630426 -17.154824 315.791656 37.456001 8.431003 273.630213 -17.155156 290.916656 41.094543 7.079205 273.481854 -17.106499 90.750000 19.473999 4.660060 273.412488 -17.398518 195.308975 44.875328 4.352257 273.455928 -16.887967 170.707642 41.276062 4.135754 273.471519 -17.354438 110.475861 30.086693 3.671918 273.436745 -17.384027 134.191971 36.854950 3.641084 273.631738 -17.160839 35.166668 10.310297 3.410830 273.449137 -17.369931 119.375000 37.159378 3.212513