Summary Page Created:Sun April 2, 2006 11:10 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600501

Instrument: ACIS Obs ID: 7063 Source: VV 114 PI: Dr. Tim Heckman Title: Feedback in VV 114: The Nearest Lyman Break Galaxy Analog

acisf07063N002 full img2.fits acisf07063N002 cntr img2.fits

Summary Page Created:Sun April 2, 2006 11:10 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600501

Instrument: ACIS Obs ID: 7063 Source: VV 114 PI: Dr. Tim Heckman Title: Feedback in VV 114: The Nearest Lyman Break Galaxy Analog

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-02T13:32:04 Date and time of file creation DATE-OBS 2005-10-20T00:52:39 Observation start date DATE-END 2005-10-20T18:20:02 Observation end date RA PNT 16.947418981109 Pointing RA DEC PNT -17.508884120936 Pointing Dec ROLL PNT 344.11216831631 Pointing Roll RA TARG 16.946667 Observer’s specified target RA DEC TARG -17.506944 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-02T15:09:10 Date and time of file creation DATE-OBS 2005-10-20T00:52:39 Observation start date DATE-END 2005-10-20T18:20:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT VV 114 Source name TITLE Feedback in VV 114: The Nearest Lyman Break Galaxy Analog

Proposal

OBSERVER Dr. Tim Heckman Principal investigator OBS ID 7063 Observation id SEQ NUM 600501 Sequence number RA NOM 16.947418981109 Nominal RA DEC NOM -17.508884120936 Nominal Dec ROLL NOM 344.11216831631 Nominal Roll

Summary Page Created:Sun April 2, 2006 11:10 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600501

Instrument: ACIS Obs ID: 7063 Source: VV 114 PI: Dr. Tim Heckman Title: Feedback in VV 114: The Nearest Lyman Break Galaxy Analog

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 17.236533 -17.651113 2185.428467 89.547798 24.405163 16.755774 -17.462721 922.750000 38.715454 23.834150 17.269807 -17.534935 1822.445190 93.544518 19.482117 16.944667 -17.507733 555.857117 33.490440 16.597488 17.218786 -17.646155 1179.735718 93.250092 12.651309 17.098414 -17.540243 280.318176 22.377367 12.526862 17.205885 -17.644250 972.500000 83.702568 11.618521 17.242242 -17.632946 1118.059814 98.697723 11.328122 17.262157 -17.567302 1043.119629 92.542839 11.271749 17.249476 -17.604385 1013.355347 91.429268 11.083489