Summary Page Created:Fri April 7, 2006 04:24 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590407

Instrument: ACIS Obs ID: 6080 Source: E0102-72[S5,-120,-17.29,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

acisf06080N002 full img2.fits acisf06080N002 cntr img2.fits

Summary Page Created:Fri April 7, 2006 04:24 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590407

Instrument: ACIS Obs ID: 6080 Source: E0102-72[S5,-120,-17.29,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T07:58:58 Date and time of file creation DATE-OBS 2004-12-20T10:40:54 Observation start date DATE-END 2004-12-20T13:14:36 Observation end date RA PNT 16.387903975212 Pointing RA DEC PNT -72.300291559271 Pointing Dec ROLL PNT 293.99159450736 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T08:23:45 Date and time of file creation DATE-OBS 2004-12-20T10:40:54 Observation start date DATE-END 2004-12-20T13:14:36 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S5,-120,-17.29,0,0] Source name TITLE AO6A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6080 Observation id SEQ NUM 590407 Sequence number RA NOM 16.387903975212 Nominal RA DEC NOM -72.300291559271 Nominal Dec ROLL NOM 293.99159450736 Nominal Roll

Summary Page Created:Fri April 7, 2006 04:24 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590407

Instrument: ACIS Obs ID: 6080 Source: E0102-72[S5,-120,-17.29,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.011654 -72.030891 12465.157227 135.540817 91.966072 16.387495 -72.225332 111.833336 12.260875 9.121155 16.290710 -72.196444 90.124138 12.594697 7.155721 16.737262 -72.413078 79.667503 11.923132 6.681759 16.611189 -72.600943 179.591370 28.821301 6.231203 16.976188 -72.549021 129.750824 28.361591 4.574878 16.759102 -72.581924 128.318939 30.649481 4.186659 15.811428 -72.058229 55.217857 13.248614 4.167821 16.557407 -72.572985 102.083336 25.074944 4.071129 16.931996 -72.518866 114.083336 28.343601 4.025012