Summary Page Created:Sat September 2, 2006 17:04 EDT page: 1 of 2

Chandra X-ray Center Seq Num: 0

Instrument: ACIS Obs ID: 61301 Source: PI: CHANDRA engineering request/realtime commanding Title: ACIS-456789 diagnostics

acisf61301 000N002 full img2.fits

Summary Page Created:Sat September 2, 2006 17:04 EDT page: 2 of 2

Chandra X-ray Center Seq Num: 0

Instrument: ACIS Obs ID: 61301 Source: PI: CHANDRA engineering request/realtime commanding Title: ACIS-456789 diagnostics

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-02T20:46:50 Date and time of file creation DATE-OBS 2002-02-21T09:07:50 Observation start date DATE-END 2002-02-21T12:25:04 Observation end date RA PNT 120.03832669644 Pointing RA DEC PNT -42.003234313192 Pointing Dec ROLL PNT 320.70222869732 Pointing Roll RA TARG 0.0 Observer’s specified target RA DEC TARG 0.0 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.92967224 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-02T21:03:35 Date and time of file creation DATE-OBS 2002-02-21T09:07:50 Observation start date DATE-END 2002-02-21T12:25:04 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT Source name TITLE ACIS-456789 diagnostics Proposal title OBSERVER CHANDRA engineering request/realtime commanding

Principal investig

OBS ID 61301 Observation id SEQ NUM Sequence number RA NOM 120.03832669644 Nominal RA DEC NOM -42.003234313192 Nominal Dec ROLL NOM 320.70222869732 Nominal Roll