Summary Page Created:Sun April 2, 2006 13:47 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590409

Instrument: ACIS Obs ID: 6082 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO6B Observations of the Standard Candles Cas A and G21.5-09

acisf06082N002 full img2.fits acisf06082N002 cntr img2.fits

Summary Page Created:Sun April 2, 2006 13:47 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590409

Instrument: ACIS Obs ID: 6082 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO6B Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-02T16:58:44 Date and time of file creation DATE-OBS 2005-10-23T05:26:39 Observation start date DATE-END 2005-10-23T06:30:09 Observation end date RA PNT 350.80497516087 Pointing RA DEC PNT 58.789063447574 Pointing Dec ROLL PNT 226.20899768822 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.92967224 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-02T17:45:47 Date and time of file creation DATE-OBS 2005-10-23T05:26:39 Observation start date DATE-END 2005-10-23T06:30:09 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT Cas A[S3,-120,-2.0,0,0] Source name TITLE AO6B Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6082 Observation id SEQ NUM 590409 Sequence number RA NOM 350.80497516087 Nominal RA DEC NOM 58.789063447574 Nominal Dec ROLL NOM 226.20899768822 Nominal Roll

Summary Page Created:Sun April 2, 2006 13:47 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590409

Instrument: ACIS Obs ID: 6082 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO6B Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.853125 58.840761 319.397736 32.197624 9.919916 350.848451 58.840363 330.511353 37.391346 8.839248 350.870029 58.828841 190.250000 22.875072 8.316914 350.857778 58.834564 202.750000 24.882826 8.148190 350.896989 58.834940 406.000000 51.052357 7.952620 350.873151 58.839582 223.068176 28.497898 7.827531 350.837289 58.841509 231.863632 31.669220 7.321419 350.891306 58.832600 161.363632 22.785416 7.081882 350.866327 58.811792 86.571426 12.591979 6.875125 350.952579 58.818348 133.041672 19.760515 6.732702