Summary Page Created:Wed January 14, 2009 00:42 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600473

Instrument: ACIS Obs ID: 5954 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

acisf05954N003 full img2.fits acisf05954N003 cntr img2.fits

Summary Page Created:Wed January 14, 2009 00:42 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600473

Instrument: ACIS Obs ID: 5954 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.10 ASCDS version number DATE 2009-01-14T03:57:44 Date and time of file creation DATE-OBS 2005-08-01T19:54:13 Observation start date DATE-END 2005-08-02T01:18:58 Observation end date RA PNT 266.41502256119 Pointing RA DEC PNT -29.012148895004 Pointing Dec ROLL PNT 274.86092672175 Pointing Roll RA TARG 266.416667 Observer’s specified target RA DEC TARG -29.007778 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.10 ASCDS version number DATE 2009-01-14T05:39:03 Date and time of file creation DATE-OBS 2005-08-01T19:54:13 Observation start date DATE-END 2005-08-02T01:18:58 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT Sgr A* Source name TITLE Simultaneous Gamma-Ray to Sub- Millimeter Monitoring of Sagittarius A*

Proposal title

OBSERVER Dr. Frederick Baganoff Principal investigator OBS ID 5954 Observation id SEQ NUM 600473 Sequence number RA NOM 266.41502256119 Nominal RA DEC NOM -29.012148895004 Nominal Dec ROLL NOM 274.86092672175 Nominal Roll

Summary Page Created:Wed January 14, 2009 00:42 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600473

Instrument: ACIS Obs ID: 5954 Source: Sgr A* PI: Dr. Frederick Baganoff Title: Simultaneous Gamma-Ray to Sub-Millimeter Monitoring of Sagittarius A*

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 266.259843 -28.913931 683.172424 33.276386 20.530245 266.375212 -29.117983 144.949997 15.236953 9.513058 266.767470 -29.025541 359.066437 37.837997 9.489573 266.422925 -28.970746 78.428574 10.607295 7.393834 266.430976 -28.983498 91.428574 12.378017 7.386366 266.398145 -29.023350 83.000000 11.691001 7.099478 266.400607 -28.944043 74.000000 11.257049 6.573659 266.767238 -29.044324 242.631226 42.194405 5.750318 266.751753 -29.024788 200.617859 35.237225 5.693350 266.703762 -29.153751 196.673218 35.235794 5.581631