Summary Page Created:Sat March 11, 2006 12:37 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290469

Instrument: HRC Obs ID: 5977 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05977N002 full img2.fits hrcf05977N002 cntr img2.fits

Summary Page Created:Sat March 11, 2006 12:37 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290469

Instrument: HRC Obs ID: 5977 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-11T16:57:38 Date and time of file creation DATE-OBS 2005-06-23T16:30:00 Observation start date DATE-END 2005-06-23T17:11:50 Observation end date RA PNT 279.01674365316 Pointing RA DEC PNT 38.804236484518 Pointing Dec ROLL PNT 173.2134091173 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-03-11T17:35:20 Date and time of file creation DATE-OBS 2005-06-23T16:30:00 Observation start date DATE-END 2005-06-23T17:11:50 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Vega Source name TITLE AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5977 Observation id SEQ NUM 290469 Sequence number RA NOM 279.01674365316 Nominal RA DEC NOM 38.804236484518 Nominal Dec ROLL NOM 173.2134091173 Nominal Roll

Summary Page Created:Sat March 11, 2006 12:37 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290469

Instrument: HRC Obs ID: 5977 Source: Vega PI: Dr. CXC Calibration Title: AO6 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.235494 38.784801 261695.203125 537.725769 486.670349 279.395394 38.716177 131.116959 24.974768 5.249978 279.405023 38.814440 131.808929 25.985346 5.072433 279.411205 38.804397 138.082138 27.837698 4.960257 279.403584 38.746096 126.971428 27.480864 4.620358 279.348123 38.821091 90.944824 20.467690 4.443336 278.712829 38.878166 80.958336 18.422634 4.394504 279.369636 38.717475 105.125000 23.987915 4.382415 278.819284 38.828884 45.027500 12.125247 3.713533 279.410029 38.784791 95.251785 25.869047 3.682076