Summary Page Created:Thu May 25, 2006 05:25 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590337

Instrument: ACIS Obs ID: 5139 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

acisf05139N002 full img2.fits acisf05139N002 cntr img2.fits

Summary Page Created:Thu May 25, 2006 05:25 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590337

Instrument: ACIS Obs ID: 5139 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:41:14 Date and time of file creation DATE-OBS 2004-04-10T18:03:20 Observation start date DATE-END 2004-04-11T00:27:32 Observation end date RA PNT 15.971324119061 Pointing RA DEC PNT -72.021142027832 Pointing Dec ROLL PNT 176.595889671 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T09:24:12 Date and time of file creation DATE-OBS 2004-04-10T18:03:20 Observation start date DATE-END 2004-04-11T00:27:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-0.5,0.5,0] Source name TITLE AO5B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5139 Observation id SEQ NUM 590337 Sequence number RA NOM 15.971324119061 Nominal RA DEC NOM -72.021142027832 Nominal Dec ROLL NOM 176.595889671 Nominal Roll

Summary Page Created:Thu May 25, 2006 05:25 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590337

Instrument: ACIS Obs ID: 5139 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906676 -72.025897 602.142883 26.393976 22.813648 16.015729 -72.034808 564.857117 49.193512 11.482350 16.009244 -72.032063 337.428558 34.849590 9.682425 16.017475 -72.033974 473.571442 49.567963 9.553982 16.247694 -72.332458 372.647614 40.363544 9.232282 16.019238 -72.032892 476.571442 51.904030 9.181781 16.013025 -72.035345 398.571442 43.707703 9.119020 15.998854 -72.028279 431.142853 47.294899 9.116054 16.002489 -72.034811 406.857147 49.057362 8.293498 15.997019 -72.031244 399.571442 48.794239 8.188906