Summary Page Created:Fri April 7, 2006 04:18 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590406

Instrument: ACIS Obs ID: 6079 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

acisf06079N002 full img2.fits acisf06079N002 cntr img2.fits

Summary Page Created:Fri April 7, 2006 04:18 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590406

Instrument: ACIS Obs ID: 6079 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T07:48:12 Date and time of file creation DATE-OBS 2004-12-20T08:09:00 Observation start date DATE-END 2004-12-20T10:40:54 Observation end date RA PNT 16.21010188802 Pointing RA DEC PNT -72.175968091895 Pointing Dec ROLL PNT 293.97522685453 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T08:17:13 Date and time of file creation DATE-OBS 2004-12-20T08:09:00 Observation start date DATE-END 2004-12-20T10:40:54 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S4,-120,-9.15,0,0] Source name TITLE AO6A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6079 Observation id SEQ NUM 590406 Sequence number RA NOM 16.21010188802 Nominal RA DEC NOM -72.175968091895 Nominal Dec ROLL NOM 293.97522685453 Nominal Roll

Summary Page Created:Fri April 7, 2006 04:18 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590406

Instrument: ACIS Obs ID: 6079 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.004959 -72.033969 3162.682617 111.385941 28.393911 16.005021 -72.028082 2475.434570 103.138504 24.001070 16.016151 -72.033841 2293.817383 99.472710 23.059767 15.906715 -72.025842 179.261368 17.188101 10.429388 16.387446 -72.225269 84.750000 11.222955 7.551487 16.430631 -72.476464 186.598007 29.472643 6.331227 16.281539 -72.388049 173.371674 30.185978 5.743451 16.269070 -72.377177 172.936600 30.763567 5.621475 16.793436 -72.430278 148.966782 27.496637 5.417636 16.401785 -72.163384 43.428570 8.550225 5.079231