Summary Page Created:Mon November 10, 2008 17:14 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590195

Instrument: ACIS Obs ID: 1769 Source: G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,3] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01769N004 full img2.fits acisf01769N004 cntr img2.fits

Summary Page Created:Mon November 10, 2008 17:14 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590195

Instrument: ACIS Obs ID: 1769 Source: G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,3] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-10T21:59:25 Date and time of file creation DATE-OBS 2000-07-05T01:17:34 Observation start date DATE-END 2000-07-05T03:43:39 Observation end date RA PNT 278.36948913106 Pointing RA DEC PNT -10.575726825285 Pointing Dec ROLL PNT 204.91005986037 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 163.95204163 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-10T22:12:41 Date and time of file creation DATE-OBS 2000-07-05T01:17:34 Observation start date DATE-END 2000-07-05T03:43:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,3]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1769 Observation id SEQ NUM 590195 Sequence number RA NOM 278.36948913106 Nominal RA DEC NOM -10.575726825285 Nominal Dec ROLL NOM 204.91005986037 Nominal Roll

Summary Page Created:Mon November 10, 2008 17:14 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590195

Instrument: ACIS Obs ID: 1769 Source: G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,3] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389814 -10.568872 745.571411 53.712311 13.880830 278.365717 -10.590112 204.857147 16.046654 12.766347 278.424468 -10.436412 26.715910 7.943994 3.363032 278.390590 -10.571867 57.285713 18.417368 3.110418 278.434733 -10.542890 18.000000 5.845194 3.079453