Summary Page Created:Tue November 18, 2008 13:10 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590196

Instrument: ACIS Obs ID: 1770 Source: G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,0] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01770N004 full img2.fits acisf01770N004 cntr img2.fits

Summary Page Created:Tue November 18, 2008 13:10 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590196

Instrument: ACIS Obs ID: 1770 Source: G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,0] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T17:48:50 Date and time of file creation DATE-OBS 2000-07-05T03:43:39 Observation start date DATE-END 2000-07-05T05:58:10 Observation end date RA PNT 278.36953601559 Pointing RA DEC PNT -10.575837754566 Pointing Dec ROLL PNT 205.32909070027 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T18:08:27 Date and time of file creation DATE-OBS 2000-07-05T03:43:39 Observation start date DATE-END 2000-07-05T05:58:10 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,0]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1770 Observation id SEQ NUM 590196 Sequence number RA NOM 278.36953601559 Nominal RA DEC NOM -10.575837754566 Nominal Dec ROLL NOM 205.32909070027 Nominal Roll

Summary Page Created:Tue November 18, 2008 13:10 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590196

Instrument: ACIS Obs ID: 1770 Source: G21.5-0.9 [Chip S3, T=110, Offsets=-1,0,0] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389831 -10.568767 664.571411 50.885384 13.060163 278.365687 -10.590073 199.285721 16.092789 12.383541 278.368538 -10.402796 124.137932 14.150925 8.772426 278.249840 -10.487734 46.477272 8.901926 5.221035 278.380191 -10.298133 37.791668 11.468903 3.295142 278.250685 -10.608695 22.020689 6.738201 3.268037 278.385112 -10.567693 36.714287 11.747199 3.125365 278.372543 -10.276521 31.719643 10.486333 3.024856