Summary Page Created:Tue November 18, 2008 18:36 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590202

Instrument: ACIS Obs ID: 1776 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-0,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01776N004 full img2.fits acisf01776N004 cntr img2.fits

Summary Page Created:Tue November 18, 2008 18:36 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590202

Instrument: ACIS Obs ID: 1776 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-0,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T23:12:29 Date and time of file creation DATE-OBS 2000-07-06T00:13:39 Observation start date DATE-END 2000-07-06T02:28:13 Observation end date RA PNT 278.37708540157 Pointing RA DEC PNT -10.572999239343 Pointing Dec ROLL PNT 208.57965731678 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T23:34:31 Date and time of file creation DATE-OBS 2000-07-06T00:13:39 Observation start date DATE-END 2000-07-06T02:28:13 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip I1, T=110, Offsets=-0,0,-1]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1776 Observation id SEQ NUM 590202 Sequence number RA NOM 278.37708540157 Nominal RA DEC NOM -10.572999239343 Nominal Dec ROLL NOM 208.57965731678 Nominal Roll

Summary Page Created:Tue November 18, 2008 18:36 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590202

Instrument: ACIS Obs ID: 1776 Source: G21.5-0.9 [Chip I1, T=110, Offsets=-0,0,-1] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389916 -10.568870 615.714294 47.657963 12.919442 278.365838 -10.590116 128.142853 13.078523 9.797961 278.598624 -10.759584 95.041664 22.689444 4.188806 278.585421 -10.730559 73.662071 17.680948 4.166183 278.614266 -10.793814 114.224731 29.616095 3.856847 278.609917 -10.783424 105.827240 27.873014 3.796763 278.576154 -10.712553 55.166668 15.618710 3.532089 278.390485 -10.570820 59.428570 18.740211 3.171180 278.550944 -10.835292 98.255814 31.166210 3.152639 278.391807 -10.571092 53.714287 17.217152 3.119812