Summary Page Created:Tue November 18, 2008 18:37 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590204

Instrument: ACIS Obs ID: 1778 Source: G21.5-0.9 [Chip I3, T=110, Offsets=-4,0,2] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01778N004 full img2.fits acisf01778N004 cntr img2.fits

Summary Page Created:Tue November 18, 2008 18:37 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590204

Instrument: ACIS Obs ID: 1778 Source: G21.5-0.9 [Chip I3, T=110, Offsets=-4,0,2] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T23:12:45 Date and time of file creation DATE-OBS 2000-07-06T04:42:40 Observation start date DATE-END 2000-07-06T06:57:09 Observation end date RA PNT 278.32543314432 Pointing RA DEC PNT -10.60170458846 Pointing Dec ROLL PNT 209.47887781055 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-18T23:34:35 Date and time of file creation DATE-OBS 2000-07-06T04:42:40 Observation start date DATE-END 2000-07-06T06:57:09 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip I3, T=110, Offsets=-4,0,2]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1778 Observation id SEQ NUM 590204 Sequence number RA NOM 278.32543314432 Nominal RA DEC NOM -10.60170458846 Nominal Dec ROLL NOM 209.47887781055 Nominal Roll

Summary Page Created:Tue November 18, 2008 18:37 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590204

Instrument: ACIS Obs ID: 1778 Source: G21.5-0.9 [Chip I3, T=110, Offsets=-4,0,2] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389551 -10.568932 1557.142822 59.667610 26.096952 278.365552 -10.590178 103.285713 12.461667 8.288274 278.365442 -10.401350 46.442856 10.203553 4.551636 278.549756 -10.786805 95.317856 21.284769 4.478219 278.440612 -10.846883 85.659088 19.349358 4.426973 278.312695 -10.915913 51.013290 11.947751 4.269698 278.474928 -10.827342 83.238640 21.381056 3.893102 278.441664 -10.850339 66.000000 17.916130 3.683831 278.545100 -10.772440 68.958336 19.541489 3.528817 278.249246 -10.487811 26.556818 7.648496 3.472162