Summary Page Created:Wed November 19, 2008 11:53 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590205

Instrument: ACIS Obs ID: 1779 Source: G21.5-0.9 [Chip I3, T=110, Offsets=-2,0,2] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01779N004 full img2.fits acisf01779N004 cntr img2.fits

Summary Page Created:Wed November 19, 2008 11:53 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590205

Instrument: ACIS Obs ID: 1779 Source: G21.5-0.9 [Chip I3, T=110, Offsets=-2,0,2] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-19T16:21:57 Date and time of file creation DATE-OBS 2000-07-06T06:57:09 Observation start date DATE-END 2000-07-06T09:20:33 Observation end date RA PNT 278.35140547657 Pointing RA DEC PNT -10.587560319825 Pointing Dec ROLL PNT 209.6965087231 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-19T16:50:52 Date and time of file creation DATE-OBS 2000-07-06T06:57:09 Observation start date DATE-END 2000-07-06T09:20:33 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip I3, T=110, Offsets=-2,0,2]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1779 Observation id SEQ NUM 590205 Sequence number RA NOM 278.35140547657 Nominal RA DEC NOM -10.587560319825 Nominal Dec ROLL NOM 209.6965087231 Nominal Roll

Summary Page Created:Wed November 19, 2008 11:53 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590205

Instrument: ACIS Obs ID: 1779 Source: G21.5-0.9 [Chip I3, T=110, Offsets=-2,0,2] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389752 -10.568962 637.142883 46.367802 13.741062 278.368059 -10.402830 98.272728 12.571958 7.816820 278.365537 -10.590154 74.428574 10.395516 7.159680 278.249695 -10.487919 49.715908 9.459308 5.255766 278.437135 -10.725193 39.847500 10.941159 3.641981 278.534691 -10.794432 83.916664 23.755096 3.532575 278.575682 -10.772648 74.871429 21.733635 3.444957 278.382300 -10.566613 25.142857 7.477502 3.362468 278.505977 -10.812606 64.011360 19.585384 3.268323 278.413116 -10.460996 21.318182 6.742664 3.161685