Summary Page Created:Wed November 19, 2008 11:39 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590207

Instrument: ACIS Obs ID: 1781 Source: G21.5-0.9 [Chip S2, T=110, Offsets=5,0,0] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

acisf01781N004 full img2.fits acisf01781N004 cntr img2.fits

Summary Page Created:Wed November 19, 2008 11:39 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590207

Instrument: ACIS Obs ID: 1781 Source: G21.5-0.9 [Chip S2, T=110, Offsets=5,0,0] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-19T16:11:59 Date and time of file creation DATE-OBS 2000-07-05T10:27:09 Observation start date DATE-END 2000-07-05T12:41:39 Observation end date RA PNT 278.46121307673 Pointing RA DEC PNT -10.53243263397 Pointing Dec ROLL PNT 206.01693070185 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 164.11410522 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-19T16:37:00 Date and time of file creation DATE-OBS 2000-07-05T10:27:09 Observation start date DATE-END 2000-07-05T12:41:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9 [Chip S2, T=110, Offsets=5,0,0]

Source name

TITLE HRC RESPONSE TO CONTIN- UUM SOURCE.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1781 Observation id SEQ NUM 590207 Sequence number RA NOM 278.46121307673 Nominal RA DEC NOM -10.53243263397 Nominal Dec ROLL NOM 206.01693070185 Nominal Roll

Summary Page Created:Wed November 19, 2008 11:39 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590207

Instrument: ACIS Obs ID: 1781 Source: G21.5-0.9 [Chip S2, T=110, Offsets=5,0,0] PI: Dr. CXC Calibration Title: HRC RESPONSE TO CONTINUUM SOURCE.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389942 -10.568986 1149.857178 59.938282 19.184019 278.368174 -10.402443 111.360001 13.603535 8.186108 278.381395 -10.271641 113.420456 15.121869 7.500426 278.365635 -10.590222 80.462502 12.187339 6.602139 278.209469 -10.335251 52.790699 13.618649 3.876354 278.211008 -10.347709 40.707642 11.898038 3.421374 278.500513 -10.541792 22.714285 6.679774 3.400457 278.505857 -10.464674 22.142857 7.235219 3.060426