Summary Page Created:Thu November 20, 2008 18:18 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590209

Instrument: ACIS Obs ID: 1783 Source: E0102-72.3 [Chip I3, T=110, Offsets=-5,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

acisf01783N005 full img2.fits acisf01783N005 cntr img2.fits

Summary Page Created:Thu November 20, 2008 18:18 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590209

Instrument: ACIS Obs ID: 1783 Source: E0102-72.3 [Chip I3, T=110, Offsets=-5,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T23:01:00 Date and time of file creation DATE-OBS 2000-07-03T05:53:32 Observation start date DATE-END 2000-07-03T08:33:32 Observation end date RA PNT 16.091037335626 Pointing RA DEC PNT -71.929369044456 Pointing Dec ROLL PNT 100.88552813933 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 163.95204163 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T23:16:28 Date and time of file creation DATE-OBS 2000-07-03T05:53:32 Observation start date DATE-END 2000-07-03T08:33:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip I3, T=110, Offsets=-5,2,0]

Source name

TITLE ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1783 Observation id SEQ NUM 590209 Sequence number RA NOM 16.091037335626 Nominal RA DEC NOM -71.929369044456 Nominal Dec ROLL NOM 100.88552813933 Nominal Roll

Summary Page Created:Thu November 20, 2008 18:18 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590209

Instrument: ACIS Obs ID: 1783 Source: E0102-72.3 [Chip I3, T=110, Offsets=-5,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906536 -72.025923 633.002502 28.189318 22.455402 16.001363 -72.034404 1425.802490 75.036095 19.001556 16.019471 -72.032703 1273.675049 67.482491 18.874155 15.997645 -72.030773 1094.739990 69.849503 15.672838 16.008604 -72.027064 822.113647 57.757450 14.233898 16.000884 -72.027998 825.897705 58.336731 14.157422 15.998041 -72.032600 851.432495 74.734718 11.392731 16.019024 -72.028614 582.625000 52.973892 10.998343 15.408740 -72.071740 141.186203 23.375345 6.039963 15.167619 -72.082711 142.722076 28.509787 5.006073