Summary Page Created:Thu November 20, 2008 13:42 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590213

Instrument: ACIS Obs ID: 1787 Source: E0102-72.3 [Chip I1, T=110, Offsets=-4,-1,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

acisf01787N004 full img2.fits acisf01787N004 cntr img2.fits

Summary Page Created:Thu November 20, 2008 13:42 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590213

Instrument: ACIS Obs ID: 1787 Source: E0102-72.3 [Chip I1, T=110, Offsets=-4,-1,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T15:25:23 Date and time of file creation DATE-OBS 2000-07-03T15:35:02 Observation start date DATE-END 2000-07-03T17:58:38 Observation end date RA PNT 15.890377400349 Pointing RA DEC PNT -71.966273308188 Pointing Dec ROLL PNT 100.28396043459 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 163.95204163 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T18:39:48 Date and time of file creation DATE-OBS 2000-07-03T15:35:02 Observation start date DATE-END 2000-07-03T17:58:38 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip I1, T=110, Offsets=-4,-1,0]

Source name

TITLE ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1787 Observation id SEQ NUM 590213 Sequence number RA NOM 15.890377400349 Nominal RA DEC NOM -71.966273308188 Nominal Dec ROLL NOM 100.28396043459 Nominal Roll

Summary Page Created:Thu November 20, 2008 13:42 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590213

Instrument: ACIS Obs ID: 1787 Source: E0102-72.3 [Chip I1, T=110, Offsets=-4,-1,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906441 -72.025924 666.431824 27.588356 24.156271 16.019471 -72.032950 682.571411 53.506203 12.756866 16.000325 -72.028169 543.000000 50.553837 10.741024 16.014572 -72.035024 483.285706 49.268959 9.809132 16.003748 -72.034587 512.142883 56.491772 9.065796 16.008824 -72.031889 289.428558 35.370941 8.182665 15.996961 -72.031744 396.142853 49.989834 7.924469 16.009142 -72.027003 370.142853 49.291771 7.509222 16.016341 -72.027987 311.571442 43.903358 7.096756 14.934842 -72.081820 168.750824 29.073177 5.804348