Summary Page Created:Thu November 20, 2008 10:37 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590216

Instrument: ACIS Obs ID: 1803 Source: E0102-72.3 [Chip S3, T=110, Offsets=-1,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

acisf01803N004 full img2.fits acisf01803N004 cntr img2.fits

Summary Page Created:Thu November 20, 2008 10:37 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590216

Instrument: ACIS Obs ID: 1803 Source: E0102-72.3 [Chip S3, T=110, Offsets=-1,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T15:05:40 Date and time of file creation DATE-OBS 2000-07-03T00:56:25 Observation start date DATE-END 2000-07-03T03:33:03 Observation end date RA PNT 16.108841744081 Pointing RA DEC PNT -72.004842806414 Pointing Dec ROLL PNT 101.04047943542 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 163.95204163 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.9 ASCDS version number DATE 2008-11-20T15:35:07 Date and time of file creation DATE-OBS 2000-07-03T00:56:25 Observation start date DATE-END 2000-07-03T03:33:03 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip S3, T=110, Offsets=-1,2,0]

Source name

TITLE ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 1803 Observation id SEQ NUM 590216 Sequence number RA NOM 16.108841744081 Nominal RA DEC NOM -72.004842806414 Nominal Dec ROLL NOM 101.04047943542 Nominal Roll

Summary Page Created:Thu November 20, 2008 10:37 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590216

Instrument: ACIS Obs ID: 1803 Source: E0102-72.3 [Chip S3, T=110, Offsets=-1,2,0] PI: Dr. CXC Calibration Title: ACIS CHIP RESPONSE TO LINES WITH E=0.6-1.5 KEV

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906460 -72.025904 887.034119 33.889965 26.173944 16.017663 -72.033792 442.142853 53.127640 8.322276 16.015827 -72.034632 420.142853 51.901337 8.095030 16.019226 -72.032703 438.142853 54.470238 8.043711 16.387115 -72.224240 138.588242 17.602619 7.873160 16.107705 -71.696814 244.916946 31.325195 7.818529 16.008632 -72.032147 274.571442 35.283478 7.781869 15.999063 -72.028344 336.000000 46.608234 7.209026 15.997164 -72.031322 340.428558 48.292618 7.049288 16.013168 -72.035180 331.000000 47.008778 7.041238