Summary Page Created:Wed November 21, 2007 02:06 EST page: 1 of 3

Chandra X-ray Center Seq Num: 390025

Instrument: HRC Obs ID: 2343 Source: HR1099 PI: Dr. CXC Calibration Title: HRC-I FOCUS CHECK

hrcf02343N004 full img2.fits hrcf02343N004 cntr img2.fits

Summary Page Created:Wed November 21, 2007 02:06 EST page: 2 of 3

Chandra X-ray Center Seq Num: 390025

Instrument: HRC Obs ID: 2343 Source: HR1099 PI: Dr. CXC Calibration Title: HRC-I FOCUS CHECK

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T06:57:37 Date and time of file creation DATE-OBS 2000-12-14T16:24:11 Observation start date DATE-END 2000-12-14T16:59:23 Observation end date RA PNT 54.198646199113 Pointing RA DEC PNT 0.58537537965432 Pointing Dec ROLL PNT 311.62592619499 Pointing Roll RA TARG 54.197083 Observer’s specified target RA DEC TARG 0.589972 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T07:05:05 Date and time of file creation DATE-OBS 2000-12-14T16:24:11 Observation start date DATE-END 2000-12-14T16:59:23 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT HR1099 Source name TITLE HRC-I FOCUS CHECK Proposal title OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2343 Observation id SEQ NUM 390025 Sequence number RA NOM 54.198646199113 Nominal RA DEC NOM 0.58537537965432 Nominal Dec ROLL NOM 311.62592619499 Nominal Roll

Summary Page Created:Wed November 21, 2007 02:06 EST page: 3 of 3

Chandra X-ray Center Seq Num: 390025

Instrument: HRC Obs ID: 2343 Source: HR1099 PI: Dr. CXC Calibration Title: HRC-I FOCUS CHECK

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 54.197064 0.587754 4601.375000 72.584549 63.393314 54.441301 0.500858 49.358620 13.793534 3.578388 54.455272 0.792047 56.914894 17.341324 3.282038 54.293634 0.334039 46.648952 15.210657 3.066860 54.240357 0.421471 28.110344 9.203691 3.054247 54.359624 0.335491 56.376785 18.471800 3.052046 54.364399 0.501149 28.590910 9.418937 3.035471