Summary Page Created:Sat September 2, 2006 09:23 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290146

Instrument: HRC Obs ID: 2590 Source: VEGA PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF VEGA

hrcf02590N002 full img2.fits hrcf02590N002 cntr img2.fits

Summary Page Created:Sat September 2, 2006 09:23 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290146

Instrument: HRC Obs ID: 2590 Source: VEGA PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF VEGA

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-09-02T12:52:23 Date and time of file creation DATE-OBS 2002-02-19T10:10:29 Observation start date DATE-END 2002-02-19T11:08:59 Observation end date RA PNT 279.35648432677 Pointing RA DEC PNT 38.92675621176 Pointing Dec ROLL PNT 56.561308785389 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-09-02T13:20:08 Date and time of file creation DATE-OBS 2002-02-19T10:10:29 Observation start date DATE-END 2002-02-19T11:08:59 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT VEGA Source name TITLE AO3 CALIBRATION OBSERVA- TIONS OF VEGA

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2590 Observation id SEQ NUM 290146 Sequence number RA NOM 279.35648432677 Nominal RA DEC NOM 38.92675621176 Nominal Dec ROLL NOM 56.561308785389 Nominal Roll

Summary Page Created:Sat September 2, 2006 09:23 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290146

Instrument: HRC Obs ID: 2590 Source: VEGA PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF VEGA

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.235535 38.783453 407056.281250 666.339294 610.884399 279.190847 38.651477 180.303574 28.901619 6.238528 279.092391 38.701092 183.189285 30.046526 6.096854 279.515203 39.137197 99.250000 23.715109 4.185096 279.158695 38.663747 123.074997 30.072578 4.092599 279.134472 38.676615 118.130356 30.053488 3.930670 279.474704 39.158279 75.208336 19.358768 3.884975 279.540790 39.061191 59.041668 15.975016 3.695875 279.117622 38.688729 116.818748 32.005672 3.649939 279.112928 38.726346 100.439163 27.630024 3.635146