Summary Page Created:Sat January 20, 2007 09:24 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290152

Instrument: HRC Obs ID: 2596 Source: BETELGEUSE PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF BETELGEUSE

hrcf02596N002 full img2.fits hrcf02596N002 cntr img2.fits

Summary Page Created:Sat January 20, 2007 09:24 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290152

Instrument: HRC Obs ID: 2596 Source: BETELGEUSE PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF BETELGEUSE

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 Processing system revision DATE 2007-01-20T14:07:54 Date and time of file creation DATE-OBS 2001-12-07T08:54:19 Observation start date DATE-END 2001-12-07T09:44:30 Observation end date RA PNT 88.796549069591 Pointing RA DEC PNT 7.4100784759373 Pointing Dec ROLL PNT 41.377154313689 Pointing Roll RA TARG 88.792917 Observer’s specified target RA DEC TARG 7.407056 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 Processing system revision DATE 2007-01-20T14:22:56 Date and time of file creation DATE-OBS 2001-12-07T08:54:19 Observation start date DATE-END 2001-12-07T09:44:30 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT BETELGEUSE Source name TITLE AO3 CALIBRATION OBSERVA- TIONS OF BETELGEUSE

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2596 Observation id SEQ NUM 290152 Sequence number RA NOM 88.796549069591 Nominal RA DEC NOM 7.4100784759373 Nominal Dec ROLL NOM 41.377154313689 Nominal Roll

Summary Page Created:Sat January 20, 2007 09:24 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290152

Instrument: HRC Obs ID: 2596 Source: BETELGEUSE PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF BETELGEUSE

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 88.551050 7.224158 366.435699 53.204578 6.887297 88.569240 7.210889 401.638397 61.679825 6.511665 88.594852 7.180033 217.118744 42.402428 5.120432 88.532633 7.243078 169.815186 33.936367 5.003929 88.549519 7.262565 168.958328 35.986065 4.695105 89.008272 7.537861 138.583328 31.886127 4.346195 88.620663 7.199838 152.762238 39.389507 3.878247 88.870827 7.543372 80.879997 20.949841 3.860650 88.969044 7.585095 155.166672 40.509804 3.830348 88.612923 7.194188 161.541672 43.498722 3.713711