Summary Page Created:Mon August 28, 2006 17:01 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290183

Instrument: HRC Obs ID: 2627 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02627N002 full img2.fits hrcf02627N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 17:01 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290183

Instrument: HRC Obs ID: 2627 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-28T20:31:55 Date and time of file creation DATE-OBS 2002-01-26T15:04:31 Observation start date DATE-END 2002-01-26T15:29:41 Observation end date RA PNT 332.06859249726 Pointing RA DEC PNT 45.735760543019 Pointing Dec ROLL PNT 336.30134585744 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-28T20:59:13 Date and time of file creation DATE-OBS 2002-01-26T15:04:31 Observation start date DATE-END 2002-01-26T15:29:41 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2627 Observation id SEQ NUM 290183 Sequence number RA NOM 332.06859249726 Nominal RA DEC NOM 45.735760543019 Nominal Dec ROLL NOM 336.30134585744 Nominal Roll

Summary Page Created:Mon August 28, 2006 17:01 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290183

Instrument: HRC Obs ID: 2627 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169897 45.742269 5630.856934 80.414909 70.022552 332.169685 45.742351 3464.840088 79.028214 43.843075 331.661829 45.838366 104.456253 21.749029 4.802801 331.698479 45.896650 88.290176 21.059629 4.192390 331.689023 45.883073 94.148216 22.656153 4.155525 331.652723 45.813761 77.432144 19.182016 4.036705 331.672444 45.863583 74.985718 20.166037 3.718416 332.386413 45.630725 51.750000 16.237993 3.186970 331.817441 45.871601 41.468750 13.179152 3.146542