Summary Page Created:Mon August 28, 2006 20:19 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290190

Instrument: HRC Obs ID: 2634 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02634N002 full img2.fits hrcf02634N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 20:19 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290190

Instrument: HRC Obs ID: 2634 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-28T23:34:34 Date and time of file creation DATE-OBS 2002-01-26T18:00:41 Observation start date DATE-END 2002-01-26T18:25:50 Observation end date RA PNT 332.30643710196 Pointing RA DEC PNT 45.699843895962 Pointing Dec ROLL PNT 336.18377996315 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T00:16:51 Date and time of file creation DATE-OBS 2002-01-26T18:00:41 Observation start date DATE-END 2002-01-26T18:25:50 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2634 Observation id SEQ NUM 290190 Sequence number RA NOM 332.30643710196 Nominal RA DEC NOM 45.699843895962 Nominal Dec ROLL NOM 336.18377996315 Nominal Roll

Summary Page Created:Mon August 28, 2006 20:19 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290190

Instrument: HRC Obs ID: 2634 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169954 45.742271 7182.782715 88.733925 80.947426 331.936802 45.866255 101.629463 18.265566 5.563992 331.883422 45.777743 67.435715 16.799183 4.014226 332.617045 45.593390 52.901962 15.296262 3.458489 332.557749 45.565953 27.930233 9.226460 3.027189 332.612595 45.576713 45.291668 15.036821 3.012051