Summary Page Created:Mon August 28, 2006 20:31 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290191

Instrument: HRC Obs ID: 2635 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02635N002 full img2.fits hrcf02635N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 20:31 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290191

Instrument: HRC Obs ID: 2635 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T00:06:41 Date and time of file creation DATE-OBS 2002-01-26T18:25:50 Observation start date DATE-END 2002-01-26T18:51:01 Observation end date RA PNT 332.24444172429 Pointing RA DEC PNT 45.682854547405 Pointing Dec ROLL PNT 336.25910593373 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T00:29:21 Date and time of file creation DATE-OBS 2002-01-26T18:25:50 Observation start date DATE-END 2002-01-26T18:51:01 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2635 Observation id SEQ NUM 290191 Sequence number RA NOM 332.24444172429 Nominal RA DEC NOM 45.682854547405 Nominal Dec ROLL NOM 336.25910593373 Nominal Roll

Summary Page Created:Mon August 28, 2006 20:31 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290191

Instrument: HRC Obs ID: 2635 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169843 45.742326 5516.916504 76.461121 72.153229 331.840592 45.797792 197.700897 35.279255 5.603885 331.848472 45.810730 170.223221 36.412704 4.674830 331.856247 45.823416 159.783936 34.802715 4.591134 331.890274 45.845183 93.833336 25.171282 3.727793 331.822698 45.766502 91.390175 25.986116 3.516885 332.525336 45.624459 65.847321 19.661551 3.349040 332.554790 45.575938 81.274513 25.390614 3.200967 332.379357 45.641932 26.180000 8.231068 3.180632 332.496529 45.659089 42.772728 13.606931 3.143451