Summary Page Created:Mon August 28, 2006 21:47 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290194

Instrument: HRC Obs ID: 2638 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02638N002 full img2.fits hrcf02638N002 cntr img2.fits

Summary Page Created:Mon August 28, 2006 21:47 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290194

Instrument: HRC Obs ID: 2638 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T01:26:55 Date and time of file creation DATE-OBS 2002-01-26T19:41:21 Observation start date DATE-END 2002-01-26T20:06:31 Observation end date RA PNT 332.13343497953 Pointing RA DEC PNT 45.754135984686 Pointing Dec ROLL PNT 336.43063941049 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T01:45:31 Date and time of file creation DATE-OBS 2002-01-26T19:41:21 Observation start date DATE-END 2002-01-26T20:06:31 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2638 Observation id SEQ NUM 290194 Sequence number RA NOM 332.13343497953 Nominal RA DEC NOM 45.754135984686 Nominal Dec ROLL NOM 336.43063941049 Nominal Roll

Summary Page Created:Mon August 28, 2006 21:47 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290194

Instrument: HRC Obs ID: 2638 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169978 45.742304 5288.909180 76.273575 69.341309 331.727680 45.862964 108.691071 28.080938 3.870635 332.459422 45.661526 81.750000 21.493195 3.803530 331.755632 45.914121 87.116966 24.026983 3.625797 331.710658 45.838145 80.369644 22.694687 3.541342 331.781013 45.811029 58.583332 16.745987 3.498351 331.754370 45.901390 99.300003 28.689295 3.461221 331.910637 45.879019 46.992859 15.043401 3.123819 332.342054 45.694870 36.924999 11.859407 3.113562 331.915602 45.770732 29.462500 9.562024 3.081199