Summary Page Created:Tue August 29, 2006 00:17 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290197

Instrument: HRC Obs ID: 2641 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

hrcf02641N002 full img2.fits hrcf02641N002 cntr img2.fits

Summary Page Created:Tue August 29, 2006 00:17 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290197

Instrument: HRC Obs ID: 2641 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T03:16:57 Date and time of file creation DATE-OBS 2002-01-26T20:56:50 Observation start date DATE-END 2002-01-26T21:22:01 Observation end date RA PNT 332.08960226404 Pointing RA DEC PNT 45.767834690038 Pointing Dec ROLL PNT 336.52651434093 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-29T04:15:27 Date and time of file creation DATE-OBS 2002-01-26T20:56:50 Observation start date DATE-END 2002-01-26T21:22:01 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Proposal ti

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2641 Observation id SEQ NUM 290197 Sequence number RA NOM 332.08960226404 Nominal RA DEC NOM 45.767834690038 Nominal Dec ROLL NOM 336.52651434093 Nominal Roll

Summary Page Created:Tue August 29, 2006 00:17 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290197

Instrument: HRC Obs ID: 2641 Source: ARLAC PI: Dr. CXC Calibration Title: AO3A HRC-S CALIBRATION OBSERVATION: MINI-SCAN OF ARLAC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170057 45.742274 4981.693359 74.636154 66.746384 331.700748 45.902246 244.596436 41.439194 5.902538 331.675760 45.869765 162.368744 34.408333 4.718879 332.384097 45.631818 86.791664 21.564823 4.024687 332.362245 45.638376 82.440163 20.509041 4.019699 331.692457 45.889758 158.841965 41.447960 3.832323 331.746202 45.876993 125.092743 35.002136 3.573860 331.711417 45.926895 104.628571 30.418591 3.439626 332.410427 45.728649 58.914894 17.403500 3.385233 332.420322 45.675874 80.458336 24.198204 3.324971